%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% Configuration, definitions and macros
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

% Units
%% time
\DeclareSIUnit\day{d}
\DeclareSIUnit\year{yr}
\DeclareSIUnit\ka{ka}
\DeclareSIUnit\Ma{Ma}
\DeclareSIUnit\Ga{Ga}

%% Geochemistry
\DeclareSIUnit\wperc{wt\%}

% German specs for siunitx
\sisetup{
    separate-uncertainty=true,
    multi-part-units=single, 
	range-phrase={--},
	%% Decimalseparator is a comma
	output-decimal-marker={,},
%	repeatunits = false,
    locale=DE
}

% Page configurations, KOMA-Script
%% Use dashes before and after page number
\renewcommand\pagemark{{\usekomafont{pagenumber}--\ \thepage\ --}}
